Index: branches/RC/admin/install/inportal_data.sql
===================================================================
diff -u -r10423 -r10480
--- branches/RC/admin/install/inportal_data.sql	(.../inportal_data.sql)	(revision 10423)
+++ branches/RC/admin/install/inportal_data.sql	(.../inportal_data.sql)	(revision 10480)
@@ -238,4 +238,6 @@
 INSERT INTO Counters VALUES (DEFAULT, 'guests_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession WHERE PortalUserId <= 0', NULL , NULL , '3600', '0', '|UserSession|');
 INSERT INTO Counters VALUES (DEFAULT, 'users_online', 'SELECT COUNT(*) FROM <%PREFIX%>UserSession', NULL , NULL , '3600', '0', '|UserSession|');
 
+UPDATE ConfigurationValues SET VariableValue = 1 WHERE VariableName = 'KeepSessionOnBrowserClose';
+
 INSERT INTO Modules VALUES ('In-Portal', 'kernel/', 'm', '4.3.1', 1, 0, '', 0, '1054738405');
